Table 38: at62a [99, Strehlow(1969)]

Pressure (atm) Pressure (kPa) Cell Width 0.0534 5.40942 26.6191 0.0657 6.65541 25.1949 0.0724 7.33412 24.436 0.0783 7.93179 24.5909 0.0923 9.34999 16.8974 0.0981 9.93753 13.8776 0.1042 10.55546 13.2938 0.1177 11.92301 12.3502 0.1306 13.22978 9.3062 0.1306 13.22978 8.6434 0.152 15.3976 7.3672 0.1615 16.35995 7.2333 0.227 22.9951 4.7623 0.227 22.9951 4.396 0.3038 30.77494 3.7712 0.2948 29.86324 3.3341 0.327 33.1251 2.8241