Table 38: at62a [99, Strehlow(1969)]

Pressure (atm) Pressure (kPa) Cell Width
0.0534  5.40942  26.6191
0.0657  6.65541  25.1949
0.0724  7.33412  24.436
0.0783  7.93179  24.5909
0.0923  9.34999  16.8974
0.0981  9.93753  13.8776
0.1042  10.55546  13.2938
0.1177  11.92301  12.3502
0.1306  13.22978  9.3062
0.1306  13.22978  8.6434
0.152  15.3976  7.3672
0.1615  16.35995  7.2333
0.227  22.9951  4.7623
0.227  22.9951  4.396
0.3038  30.77494  3.7712
0.2948  29.86324  3.3341
0.327  33.1251  2.8241